%!TEX root = ../Main.tex
\makeglossaries
\iffalse
	\newglossarystyle{manualfixedwidth}{
	\setglossarystyle{long3colheader} % Use existing stable base style
	\newcolumntype{R}{>{\raggedleft\arraybackslash}p{2cm}}
	\setlength\LTleft{-5pt}
	\renewenvironment{theglossary}%
	{\begin{longtable}{p{4cm}p{10cm}R}} % override only the tabular environment specifying widths
			{\end{longtable}}%
	}
\fi

\newglossarystyle{manualfixedwidth}{
\setglossarystyle{long3colheader} % Use existing stable base style
\newcolumntype{R}{>{\raggedleft\arraybackslash}p{2cm}}
\newcolumntype{D}{>{\raggedright\arraybackslash}p{4.5cm}}
\setlength\LTleft{-5pt}
\renewenvironment{theglossary}%
{\begin{longtable}{Dp{9.5cm}R}} % override only the tabular environment specifying widths
		{\end{longtable}}%
\renewcommand{\arraystretch}{1.1} % 1.5 times normal line height
}

\setglossarystyle{manualfixedwidth}

%\setglossarystyle{long3colheader}
\renewcommand*{\entryname}{Wort/Abkürzung}
\renewcommand*{\descriptionname}{Beschreibung}
\renewcommand*{\pagelistname}{Seite(n)}
\setlength{\glsdescwidth}{0.75\textwidth}
\glsenablehyper
\renewcommand*{\glsclearpage}{}
\renewcommand{\acronymname}{Abkürzungsverzeichnis}

%%% https://golatex.de/viewtopic.php?t=23348
% masculine genitive
\glsaddkey
{genitive}% key
{}% default value
{\glsentrygenitive}% no link cs
{\Glsentrygenitive}% no link ucfirst cs
{\glsgen}% link cs
{\Glsgen}% link ucfirst cs
{\GLSgen}% link all caps cs
