% !TEX root = ../Main.tex
% ==============================================================================
% Logo Configuration
% ==============================================================================
% Description: This file configures which logos appear on the title page and
%              their positioning. Multiple logos can be displayed simultaneously.
%              The AddLogo command handles logo placement and scaling.
% Usage:       Uncomment the desired logo(s) and adjust parameters as needed.
% Author: [Your Name]
% Date: [Date]
% ==============================================================================

% ------------------------------------------------------------------------------
% Logo Configuration Syntax
% ------------------------------------------------------------------------------
% \AddLogo{LogoName}{ScaleX}{ScaleY}{Format}
%
% Parameters:
%   LogoName - Name of the logo file (without extension)
%   ScaleX   - Horizontal scaling factor (1.0 = original width)
%   ScaleY   - Vertical scaling factor (1.0 = original height)
%   Format   - File format (png, svg, pdf, jpg)
%
% Logo files must be placed in: HSRTReport/Assets/Images/
% ------------------------------------------------------------------------------

% ------------------------------------------------------------------------------
% Available Logos
% ------------------------------------------------------------------------------
% Below are pre-configured logos for various departments and organizations.
% Uncomment (remove the % at the beginning) the logo(s) you want to use.
% Multiple logos can be active simultaneously and will be arranged automatically.
% ------------------------------------------------------------------------------

% --- Student Parliament (STUPA) Logo ---
% Use this for student organization related documents
% Scale: 110% width, 70% height
%\AddLogo{STUPA}{1.1}{0.7}{png}

% --- Informatics Department Logo (Combined Version) ---
% Standard logo for informatics department documents
% Scale: 90% width, 100% height
% This logo is active by default
\AddLogo{INF_Kombiniert}{0.9}{1}{svg}

% --- Hochschule Reutlingen (HSRT) Main Logo ---
% Official university logo for formal documents
% Scale: 170% width, 100% height
% Uncomment for official university submissions
% \AddLogo{HSRT}{1.7}{1}{png}

% --- Medical Technical Informatics (METI) Logo ---
% Specific logo for METI study program
% Scale: 100% width, 50% height
% Uncomment for METI-specific documents
% \AddLogo{METI}{1.0}{0.5}{png}

% ------------------------------------------------------------------------------
% Custom Logo Addition
% ------------------------------------------------------------------------------
% To add your own custom logo:
% 1. Place the logo file in HSRTReport/Assets/Images/
% 2. Add a configuration line following this pattern:
%    \AddLogo{YourLogoName}{ScaleX}{ScaleY}{Format}
%
% Example for a company logo:
% \AddLogo{CompanyLogo}{1.2}{1.2}{pdf}
%
% Example for a research group logo:
% \AddLogo{ResearchGroup}{0.8}{0.8}{png}
% ------------------------------------------------------------------------------

% ------------------------------------------------------------------------------
% Logo Positioning Notes
% ------------------------------------------------------------------------------
% - Logos are automatically positioned on the title page
% - Multiple logos are arranged in a grid layout
% - The order of \AddLogo commands determines the display order
% - Scaling factors can be adjusted for optimal visual balance
% - SVG format is recommended for scalability
% - PNG format is suitable for raster images
% - PDF format provides best quality for vector graphics
% ------------------------------------------------------------------------------

% ------------------------------------------------------------------------------
% Troubleshooting
% ------------------------------------------------------------------------------
% If a logo doesn't appear:
% 1. Check that the file exists in HSRTReport/Assets/Images/
% 2. Verify the file extension matches the format parameter
% 3. Ensure the \AddLogo line is not commented out
% 4. Check for typos in the logo name
% 5. Try different scaling factors if the logo appears too small/large
% ------------------------------------------------------------------------------

% ==============================================================================
% End of Logo Configuration
% ==============================================================================
